\documentclass[twoside,11pt]{style/class/PhDthesisPSnPDF}

\input{style/style.tex}
\input{appendix/glossary.tex}

\begin{document}
\input{style/first-page}
\input{content/preamble/abstract}
\frontmatter
\input{content/preamble/dedication}
\input{content/preamble/acknowledgement}
\setcounter{secnumdepth}{3}
\setcounter{tocdepth}{3}
\tableofcontents
\listoffigures
\listoftables
\mainmatter
% Uncomment to print `Chapter 1` instead of just `1`
\renewcommand{\chaptername}{}

% test comment
\input{content/intro}
\input{content/background}
\input{content/overview}
\input{content/design}
\input{content/evaluation}
\input{content/discussion}
\input{content/threats}
\input{content/related}
\input{content/conclusion}

\printglossary[type=\acronymtype]
\bibliographystyle{style/class/PhDbiblio-url2}
\renewcommand{\bibname}{References}
\bibliography{main}
\input{appendix/appendix}
\end{document}
