\chapter{Design}\label{s:design}
\begin{mynote}
	Our contribution in this chapter is three-fold:
	\vspace{-0.2cm}
	\begin{enumerate}[label=\emph{C\textsubscript{\arabic*}}, itemsep=0.2pt]
		\item We analyze the requirements for \mysystem (\Cref{ss:requirements_analysis}).
		\item We propose a conceptual design for \mysystem's architecture (\Cref{ss:design_of_mysystem})
		\item We describe how \mysystem enables predictive analytics through digital twinning (\Cref{ss:design_discussion})
	\end{enumerate}
\end{mynote}
\section{Requirements Analysis}\label{ss:requirements_analysis}
In this section we determine the requirements that should be fulfilled by \mysystem.
We present here the stakeholders identified by our literature survey (see \Cref{sss:digital_twins_for_datacenters}) and the relevant use-cases.
Afterwards, we list the functional and non-functional requirements for \mysystem.

\subsection{Stakeholders}\label{sss:stakeholders}
\begin{enumerate}[label=\textbf{S\arabic*:},align=left]
	\item \textbf{Datacenter} \\
\end{enumerate}

\subsection{Use-cases}\label{sss:use_cases}
\begin{enumerate}[label=\textbf{UC\arabic*:},align=left]
	\item \textbf{Datacenter} \\
\end{enumerate}

\subsection{Functional Requirements}\label{sss:functional_requirements}
\begin{enumerate}[label=\textbf{FR\arabic*:},align=left]
	\item \textbf{Datacenter} \\
\end{enumerate}

\subsection{Non-functional Requirements}\label{sss:non_functional_requirements}
\begin{enumerate}[label=\textbf{NFR\arabic*:},align=left]
	\item \textbf{Datacenter} \\
\end{enumerate}

\section{Design of \emph{Sunfish}}\label{ss:design_of_mysystem}

\subsection{Digital Thread}

\subsection{Data Storage}

\subsection{Predictive Analytics Module}

\section{Discussion}\label{ss:design_discussion}

