From 7631e050a4fdacf123c1069d4776ac703ca96a93 Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Wed, 3 Jun 2026 09:59:24 +0200
Subject: feat: fixed the first research question, added figure spacing

---
 sources/dt_features_comparison.tex | 27 +++++++++++++++++++++++++++
 1 file changed, 27 insertions(+)
 create mode 100644 sources/dt_features_comparison.tex

(limited to 'sources/dt_features_comparison.tex')

diff --git a/sources/dt_features_comparison.tex b/sources/dt_features_comparison.tex
new file mode 100644
index 0000000..79e7675
--- /dev/null
+++ b/sources/dt_features_comparison.tex
@@ -0,0 +1,27 @@
+\begin{table}[t]
+	\centering
+	\renewcommand{\arraystretch}{1.4}
+	\begin{tabular}{m{0.4\linewidth}cccc}
+		\toprule
+		Feature                                     & ExaDigiT~\cite{DBLP:conf/sc/BrewerMKWBHSGGW24} & SmartDC~\cite{DBLP:conf/noms/ZhangZLZWC22} & DyTwin~\cite{DBLP:conf/sc/TaheriBPRHDEWPM24} \\
+		\midrule
+		Virtual Prototyping                         &                                                & \ding{51}                                  &                                              \\
+		Scenario Exploration                        &                                                &                                            &                                              \\
+		3D Facility Modelling                       & \ding{51} (via CFD and Modelica)               & \ding{51} (via CFD and 6SigmaDC)           &                                              \\
+		Predictive maintenance                      &                                                &                                            &                                              \\
+		Predictive energy modelling                 &                                                & \ding{51}                                  &                                              \\
+		Reliability and availability modeling       &                                                &                                            &                                              \\
+		Cooling system modelling                    &                                                & \ding{51}                                  &                                              \\
+		Network modelling                           &                                                &                                            &                                              \\
+		Predictive modelling                        &                                                &                                            &                                              \\
+		Power/Energy consumption optimization (PUE) &                                                & \ding{51}                                  &                                              \\
+		Heat and Airflow distribution modelling     &                                                & \ding{51}                                  &                                              \\
+		Visual analytics dashboard                  &                                                &                                            &                                              \\
+		Forensic analysis and diagnostics           &                                                &                                            &                                              \\
+		Failure detection                           &                                                &                                            &                                              \\
+		Operational optimization                    &                                                &                                            &                                              \\
+		Resource allocation                         &                                                &                                            &                                              \\
+		\midrule
+	\end{tabular}
+	\caption{Comparison of selected features of existing datacenter digital twins.}
+\end{table}
-- 
cgit v1.2.3

