From 79233530772aef68eda246b4943b2c7b53f398e0 Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Mon, 27 Jul 2026 12:40:11 +0200
Subject: fix: fixed figure 5.4 rate --> ratios

---
 content/evaluation.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'content/evaluation.tex')

diff --git a/content/evaluation.tex b/content/evaluation.tex
index a0a6617..0498ff7 100644
--- a/content/evaluation.tex
+++ b/content/evaluation.tex
@@ -124,7 +124,7 @@ The results are in \Cref{fig:red_yellow_alarms,fig:alarms_vs_failures,fig:failur
 \begin{figure}[t]
 	\centering
 	\includegraphics[width=0.8\linewidth]{images/alarms_vs_failures.pdf}
-	\caption[Total number of failures versus numbe rof alarms raised.]{Comparison between the total number of raised alarms and the ground truth failure distribution during a SURF month workload in the SURF-SARA cluster. The failure trace used in this plot models Gmail outage reports~\cite{DBLP:journals/tpds/TalluriNCKCBI26}.}
+	\caption[Total number of failures versus number of alarms raised.]{Comparison between the total number of raised alarms and the ground truth failure distribution during a SURF month workload in the SURF-SARA cluster. The failure trace used in this plot models Gmail outage reports~\cite{DBLP:journals/tpds/TalluriNCKCBI26}.}
 	\label{fig:alarms_vs_failures}
 \end{figure}
 
@@ -150,7 +150,7 @@ Moreover, they conclude through DyTwin's experimental setup, Taheri \etal achiev
 In our experiment, the numbers differ significantly.
 \begin{figure}[t]
 	\centering
-	\includegraphics[width=0.8\linewidth]{images/failure_detecton_rate.pdf}
+	\includegraphics[width=0.8\linewidth]{images/failure_detecton_rate2.pdf}
 	\caption[Failure detection rate overview.]{In this figure we show the total failure detection rate (\textcolor{Thistle}{\ding{110} \textbf{\sffamily Red + Yellow Alarms / Total Failures}}).
 		Our results are much different from DyTwin's performance~\cite{DBLP:conf/sc/TaheriBPRHDEWPM24}.
 		We believe this is due to the irreconcilable differences between our experimental setups.}
-- 
cgit v1.2.3

