From e9a1b6078e366a8ee071f5d423a1874608618e4d Mon Sep 17 00:00:00 2001
From: Dante Niewenhuis <d.niewenhuis@hotmail.com>
Date: Mon, 19 May 2025 13:31:34 +0200
Subject: Removing gh-pages site from master branch (#338)

* Removing site from master branch

* Updated README.md
---
 site/docs/intro.mdx | 27 ---------------------------
 1 file changed, 27 deletions(-)
 delete mode 100644 site/docs/intro.mdx

(limited to 'site/docs/intro.mdx')

diff --git a/site/docs/intro.mdx b/site/docs/intro.mdx
deleted file mode 100644
index 840ae343..00000000
--- a/site/docs/intro.mdx
+++ /dev/null
@@ -1,27 +0,0 @@
----
-sidebar_position: 1
----
-
-# Introduction
-
-OpenDC is a free and open-source platform for cloud datacenter simulation aimed at both research and education.
-
-<div className="container">
-    <div className="row">
-        <div className="col col-3 text--center">
-            <img src={require("@site/src/components/HomepageFeatures/screenshot-construction.png").default} alt="Constructing a cloud datacenter with OpenDC" />
-        </div>
-        <div className="col col-3 text--center">
-            <img src={require("@site/src/components/HomepageFeatures/screenshot-results.png").default} alt="Analysis of results reported by OpenDC" />
-        </div>
-    </div>
-</div>
-
-Users can construct new datacenter designs and define portfolios of scenarios (experiments) to explore how their designs
-perform under different workloads, schedulers, and phenomena (e.g., failures or performance interference).
-
-OpenDC is accessible both as a ready-to-use platform hosted by us online at [app.opendc.org](https://app.opendc.org), and as
-source code that users can run locally on their own machine or via Docker.
-
-To learn more about OpenDC, have a look through our paper on [OpenDC 2.0](https://atlarge-research.com/pdfs/ccgrid21-opendc-paper.pdf)
-or on our [vision](https://atlarge-research.com/pdfs/opendc-vision17ispdc_cr.pdf).
-- 
cgit v1.2.3

