From 4a010c6b9e033314a2624a0756dcdc7f17010d9d Mon Sep 17 00:00:00 2001
From: Dante Niewenhuis <d.niewenhuis@hotmail.com>
Date: Mon, 16 Sep 2024 11:29:26 +0200
Subject: All simulation are now run with a single CPU and single MemoryUnit.
 multi CPUs are combined into one. This is for performance and explainability.
 (#255)

---
 site/docs/getting-started/2-experiment.mdx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'site/docs/getting-started/2-experiment.mdx')

diff --git a/site/docs/getting-started/2-experiment.mdx b/site/docs/getting-started/2-experiment.mdx
index e25dffc9..14970ea6 100644
--- a/site/docs/getting-started/2-experiment.mdx
+++ b/site/docs/getting-started/2-experiment.mdx
@@ -31,7 +31,7 @@ The baseline for comparison in a portfolio is the **base scenario**. It represen
 or, when planning infrastructure from scratch, it consists of very simple base workloads and topologies.
 The other scenarios in a portfolio, called the **candidate scenarios**, represent changes to the configuration
 that might be of interest to the datacenter designer. Dividing scenarios into these two categories ensures that any
-comparative insights provided by OpenDC are meaningful within the context of the current architecture.
+comparative insights provided by OpenDC are meaningful within the simHyperVisorContext of the current architecture.
 
 To create a new scenario, open a portfolio in the OpenDC web interface and click on ‘+ New Scenario’ in the top right
 corner of the scenario table. This opens a modal with the following options (as shown in [Figure 1](#explore)):
-- 
cgit v1.2.3

