From e9a1b6078e366a8ee071f5d423a1874608618e4d Mon Sep 17 00:00:00 2001
From: Dante Niewenhuis <d.niewenhuis@hotmail.com>
Date: Mon, 19 May 2025 13:31:34 +0200
Subject: Removing gh-pages site from master branch (#338)

* Removing site from master branch

* Updated README.md
---
 site/community/1-team.mdx | 13 -------------
 1 file changed, 13 deletions(-)
 delete mode 100644 site/community/1-team.mdx

(limited to 'site/community/1-team.mdx')

diff --git a/site/community/1-team.mdx b/site/community/1-team.mdx
deleted file mode 100644
index 719bf280..00000000
--- a/site/community/1-team.mdx
+++ /dev/null
@@ -1,13 +0,0 @@
-import TeamMembers from '@site/src/components/TeamMembers';
-
-# Team
-
-The OpenDC project is currently developed and maintained by the [AtLarge Research Group](https://www.atlarge-research.com/)
-from Amsterdam, the Netherlands. The team that works (or has worked) on OpenDC consists of:
-
-<TeamMembers />
-
-## Want to join our team?
-
-If you are interested in joining the OpenDC team, sent us a message at [opendc@atlarge-research.com](mailto:opendc@atlarge-research.com)
-or visit the [AtLarge Research website](https://www.atlarge-research.com/new_students.html) for more information.
-- 
cgit v1.2.3

