From ee72786e62f74062204f8830aa965131a5c0686d Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Sun, 28 Jun 2026 18:17:23 +0200
Subject: feat: added the last figure

---
 main.tex | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 32b7591..d1b8bc0 100644
--- a/main.tex
+++ b/main.tex
@@ -6,8 +6,7 @@
 
 \begin{frame}\frametitle{Motivation}
 	\begin{tcolorbox}[title=Context]
-		21\textsuperscript{st} century datacenters (DC) are mostly heterogeneous~\cite{DBLP:conf/date/MilojicicFDR21} and
-		modern computational needs of AI drive managers to diversify datacenters even more~\cite{DBLP:journals/computer/AthavaleBBMMPS24}.
+		21\textsuperscript{st} century datacenters (DC) are mostly heterogeneous~\cite{DBLP:conf/date/MilojicicFDR21} and modern computational needs of AI drive managers to diversify them even more~\cite{DBLP:journals/computer/AthavaleBBMMPS24}.
 		In result datacenters become extremely complex and hard to operate with millions of CPU's, GPU's etc.
 	\end{tcolorbox}
 	\begin{center}
@@ -68,7 +67,6 @@
 
 \begin{frame}\frametitle{\textbf{RQ1}: Literature Review II}
 	% Mandatory: split the figure into 2: top and bottom, and that way you can fill in the entire slide nicely.
-
 	\begin{tcolorbox}[title=A holistic DCDT system model]
 		We propose a holistic model of datacenter digital twinning that can be mapped to each system from \textbf{Table 1.1}. Within this model (see \textbf{Fig. 1.3}) we introduce a concept of the \emph{Digital Thread}: a bridge between the DCDT and the physical DC equipment.
 	\end{tcolorbox}
@@ -181,7 +179,7 @@
 		\end{center}
 		\vspace{-0.3cm}
 		\tiny
-		\textbf{Figure 1.7b:} Experiment 1b. The mean failure detection rate is around 15\%. Even though this seems low, if we look at \textbf{Fig. E.1} (see Extra Slides), this simply means around 15\% of failures are unexpected.
+		\textbf{Figure 1.7b:} Experiment 1b. The mean failure detection rate is around 12\%. Even though this seems low, if we look at \textbf{Fig. E.1} (see Extra Slides), this simply means around 12\% of failures are unexpected.
 	\end{minipage}
 	% Explain what the axis are in the figure caption.
 	% Talk about the experimental setup in the figure.
-- 
cgit v1.2.3

