From c11064f083ef52b41b5f60c50bb4cd2e67b11aab Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Fri, 12 Jun 2026 16:55:41 +0200
Subject: fix: tidied up the directory

---
 main.tex | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 6c23f8f..757f0b7 100644
--- a/main.tex
+++ b/main.tex
@@ -6,8 +6,8 @@
 
 \begin{frame}\frametitle{Motivation}
 	\begin{tcolorbox}[title=Context]
-		Heterogeneous datacenter architectures are common ~\cite{DBLP:conf/date/MilojicicFDR21} and
-		modern computational needs of AI drive managers to diversify datacenters even more~\cite{DBLP:journals/computer/AthavaleBBMMPS24}.
+                21\textsuperscript{st} century datacenters are heterogeneous~\cite{DBLP:conf/date/MilojicicFDR21} and
+		modern computational needs of AI drive managers to diversify datacenters even more than ever~\cite{DBLP:journals/computer/AthavaleBBMMPS24}.
 		In result datacenters become extremely complex and hard to operate with millions of CPU's, GPU's etc.
 	\end{tcolorbox}
 	\begin{center}
@@ -95,7 +95,7 @@
 		We need to act now.
 	\end{tcolorbox}
 	\begin{center}
-		\includegraphics[height=10em]{images/IosupLVG22-2_cropped.pdf}
+		\includegraphics[height=10em]{images/manageability.pdf}
 	\end{center}
 	\tiny
 	\textbf{Figure E.1:} Horizontally: the most important research areas in computer science in Netherlands.
@@ -110,7 +110,7 @@
 		Datacenters meet this requirement easily because they already connect hundreds of monitoring sensors. 	\end{tcolorbox}
 
 	\begin{center}
-		\includegraphics[height=10em]{images/TaoIEEE2019-3_cropped.pdf}
+		\includegraphics[height=10em]{images/dt_timeline.pdf}
 	\end{center}
 	\tiny
 
@@ -128,7 +128,7 @@
 		Only a constant bi-directional interaction (digital twin $\iff$ physical entity) can achieve this.
 	\end{tcolorbox}
 	\begin{center}
-		\includegraphics[height=10em]{images/AthavaleBBMMPS24-3_cropped.pdf}
+		\includegraphics[height=10em]{images/digital_twin_ms.pdf}
 	\end{center}
 	\tiny \textbf{Figure E.3:} Real-time control that is tightly-coupled with the IT equipment is a prerequisite for timely predictions within seconds/minutes~\cite{DBLP:journals/computer/AthavaleBBMMPS24}.
 \end{frame}
-- 
cgit v1.2.3

