From a9844b1682485e37252f4df22a0a643503a1f83c Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Sun, 21 Jun 2026 15:16:08 +0200
Subject: fix: changed the numbers in figure 1.1 to be more realistic

---
 main.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 975530b..f184100 100644
--- a/main.tex
+++ b/main.tex
@@ -62,6 +62,8 @@
 	\end{tcolorbox}
 	\input{images/table.tex}
 	% Research on DTs for datacenters have been separate, siloed efforts focused on either datacenter cooling, network performance, power consumption or visualization efforts.
+	% CFD usually means Navier-Stokes equations.
+	% CFD models take ages to compute.
 \end{frame}
 
 \begin{frame}\frametitle{\textbf{RQ1}: Literature Review II}
-- 
cgit v1.2.3

