From a493b539aa288b8edc9fe501256cf6e0fc8322ca Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Sun, 21 Jun 2026 16:49:30 +0200
Subject: feat: finished table 1.1

---
 main.tex | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index f184100..79be7f8 100644
--- a/main.tex
+++ b/main.tex
@@ -57,8 +57,10 @@
 
 \begin{frame}\frametitle{\textbf{RQ1}: Literature Review I}
 	\begin{tcolorbox}[title=Results]
-		This is a dummy sentence meant to make the tcolorbox have more than 2 lines of text width so that I am able to show the text and the table spacing better.
-		I hope it fits its purpose well.
+		The literature on DCDTs is scarce.
+		Some systems barely classify as DTs (\emph{e.g.,} Kalibre~\cite{DBLP:conf/sensys/WangZD0TCWZ20}, ChatTwin~\cite{DBLP:conf/sensys/LiW0Z0T23}).
+		Existing deployments specialize in Cooling and Heat Modelling, together with 3D visualizations.
+		Most lack crucial predictive DC behaviour modelling.
 	\end{tcolorbox}
 	\input{images/table.tex}
 	% Research on DTs for datacenters have been separate, siloed efforts focused on either datacenter cooling, network performance, power consumption or visualization efforts.
-- 
cgit v1.2.3

