From 89d06c029d081e462580a4b346131c8008908e14 Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Wed, 24 Jun 2026 17:18:54 +0200
Subject: style: fixed figure 1.3 style a little bit; added new arrows

---
 main.tex | 7 +++----
 1 file changed, 3 insertions(+), 4 deletions(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index ab51130..27b1069 100644
--- a/main.tex
+++ b/main.tex
@@ -59,7 +59,7 @@
 		The literature on DCDTs is scarce.
 		Some systems barely classify as DTs (\emph{e.g.,} Kalibre~\cite{DBLP:conf/sensys/WangZD0TCWZ20}, ChatTwin~\cite{DBLP:conf/sensys/LiW0Z0T23}).
 		Existing deployments specialize in \textcolor{Red}{Cooling and Heat Modelling}, together with \textcolor{Red}{3D visualizations}.
-		Most lack crucial predictive DC behaviour modelling.
+		Most lack predictive modelling of DC operations.
 	\end{tcolorbox}
 	\input{images/table.tex}
 	% Research on DTs for datacenters have been separate, siloed efforts focused on either datacenter cooling, network performance, power consumption or visualization efforts.
@@ -71,8 +71,7 @@
 	% Mandatory: split the figure into 2: top and bottom, and that way you can fill in the entire slide nicely.
 
 	\begin{tcolorbox}[title=A holistic DCDT system model]
-		We propose a generic model of datacenter digital twinning that can be mapped to each system from \textbf{Table 1.1}. To answer \textbf{RQ2}, we design a ref. arch. for \emph{Operations Model}.
-		We introduce the \emph{Digital Thread}: a bridge between software and reality.
+		We propose a generic model of datacenter digital twinning that can be mapped to each system from \textbf{Table 1.1}. Within this model (see \textbf{Fig. 1.3}) we introduce a concept of the \emph{Digital Thread}: a bridge between the DC digital twin and the physical DC equipment.
 	\end{tcolorbox}
 	\begin{center}
 		\vspace{-0.1cm}
@@ -84,7 +83,7 @@
 	% Not really a digital twin per se.
 
 	\tiny
-	\textbf{Figure 1.3:} To answer \textbf{RQ1} we designed a generic datacenter digital twin system model based on a comprehensive literature review and findings from \textbf{Table 1.1}. The \emph{Infrastructure Model} simulates the structure of the DC and the \emph{Operations model} simulates the behaviour of the DC.
+	\textbf{Figure 1.3:} To answer \textbf{RQ1} we designed a generic datacenter digital twin system model based on a comprehensive literature review and findings from \textbf{Table 1.1}. The \emph{Infrastructure Model} simulates the structure of the DC and the \emph{Operations Model} simulates the behaviour of the DC.
 	% Consider splitting the figure into 2 a.k.a. top and bottom.
 	% By the AIAA definition, the DT mimicks the structure and behaviour.
 	% Data Lake -> Data Storage
-- 
cgit v1.2.3

