From 57c345d589180fbc84df57485a53f35da0a4a905 Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Sun, 21 Jun 2026 17:02:14 +0200
Subject: style: added visual guides to table 1.1 for better readability

---
 main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 79be7f8..0dc19b9 100644
--- a/main.tex
+++ b/main.tex
@@ -59,7 +59,7 @@
 	\begin{tcolorbox}[title=Results]
 		The literature on DCDTs is scarce.
 		Some systems barely classify as DTs (\emph{e.g.,} Kalibre~\cite{DBLP:conf/sensys/WangZD0TCWZ20}, ChatTwin~\cite{DBLP:conf/sensys/LiW0Z0T23}).
-		Existing deployments specialize in Cooling and Heat Modelling, together with 3D visualizations.
+                Existing deployments specialize in \textcolor{Red}{Cooling and Heat Modelling}, together with \textcolor{Red}{3D visualizations}.
 		Most lack crucial predictive DC behaviour modelling.
 	\end{tcolorbox}
 	\input{images/table.tex}
-- 
cgit v1.2.3

