From 43318a61fd31e0f81b0df67e8a8b3c4a9423dda4 Mon Sep 17 00:00:00 2001
From: mjkwiatkowski <mati.rewa@gmail.com>
Date: Thu, 18 Jun 2026 19:05:05 +0200
Subject: fix: fixed the layour for the reference architecture and the system
 model (wip)

---
 main.tex | 37 +++++++++++++++++++++++++++++++++----
 1 file changed, 33 insertions(+), 4 deletions(-)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 2f2ce2c..1a7d4a7 100644
--- a/main.tex
+++ b/main.tex
@@ -65,8 +65,14 @@
 
 \begin{frame}\frametitle{\textbf{RQ1}: Literature Review II}
 	% Mandatory: split the figure into 2: top and bottom, and that way you can fill in the entire slide nicely.
-	\includegraphics[width=\textwidth]{images/system_model2.pdf}
-	\vspace{0.3cm}
+
+	\begin{tcolorbox}[title=A generic system model]
+
+		This is a dummy sentence meant to make the tcolorbox have more than 2 lines of text width so that I am able to show the text and the table spacing better.
+	\end{tcolorbox}
+	\begin{center}
+		\includegraphics[width=0.8\textwidth]{images/system_model2.pdf}
+	\end{center}
 
 	\tiny
 	\textbf{Figure 1.3:} To answer \textbf{RQ1} we designed a generic datacenter digital twin system model based on a comprehensive literature review and findings from \textbf{Table 1.1}.
@@ -77,14 +83,37 @@
 \begin{frame}\frametitle{\textbf{RQ2}: Reference Architecture}
 	\begin{minipage}[b]{0.45\linewidth}
 		\begin{center}
-			\includegraphics[width=1.35\textwidth]{images/ref_architecture.pdf}
+			\includegraphics[width=1.25\textwidth]{images/ref_architecture.pdf}
 		\end{center}
 		\vspace{-0.2cm}
 		\tiny
 		\textbf{Figure 1.4:} The predictive datacenter digital twin architecture.
 	\end{minipage}
 	\hfill
-	\begin{minipage}[b]{0.4\linewidth}
+	% Consider adding this minipage directly to the ``draw.io'' diagram
+	\begin{minipage}[b]{0.42\linewidth}
+		\footnotesize
+		\textbf{Functional Requirements}
+		\tiny
+
+		\textbf{FR1:} The system shall be able to
+
+		\textbf{FR2:} The system should be able to
+
+		\textbf{FR3:} The system needs to do this and that
+
+		\vspace{1cm}
+		\footnotesize
+		\textbf{Non-functional Requirements}
+		\tiny
+
+		\textbf{NFR1:} The system shall be able to
+
+		\textbf{NFR2:} The system should be able to
+
+		\textbf{NFR3:} The system needs to do this and that
+
+		\vspace{3cm}
 	\end{minipage}
 \end{frame}
 
-- 
cgit v1.2.3

